From 084f4d75fce7d27b5d06ae73d741ecb121b55c17 Mon Sep 17 00:00:00 2001
From: Adam Malczewski <github@tradam.dev>
Date: Tue, 2 Jun 2026 14:30:57 +0900
Subject: Fix cache req badge wrap, remove cache cost note, pace-aware key
 usage bars

---
 packages/frontend/src/lib/components/CacheRatePanel.svelte | 7 +------
 1 file changed, 1 insertion(+), 6 deletions(-)

(limited to 'packages/frontend/src/lib/components/CacheRatePanel.svelte')

diff --git a/packages/frontend/src/lib/components/CacheRatePanel.svelte b/packages/frontend/src/lib/components/CacheRatePanel.svelte
index c35cbb5..88985a0 100644
--- a/packages/frontend/src/lib/components/CacheRatePanel.svelte
+++ b/packages/frontend/src/lib/components/CacheRatePanel.svelte
@@ -55,7 +55,7 @@ const lastHitPct = $derived(
 				{#if tabTitle}
 					<span class="badge badge-xs badge-ghost">{tabTitle}</span>
 				{/if}
-				<span class="badge badge-xs ml-auto">{cacheStats.requests} req</span>
+				<span class="badge badge-xs ml-auto whitespace-nowrap">{cacheStats.requests} req</span>
 			</div>
 
 			<!-- Headline cumulative hit rate -->
@@ -120,10 +120,5 @@ const lastHitPct = $derived(
 				</div>
 			</div>
 		</div>
-
-		<p class="text-xs text-base-content/40">
-			Cache reads cost ~10% of fresh input; writes cost ~25% more. A high hit
-			rate after the first turn means caching is working. Resets on reload.
-		</p>
 	{/if}
 </div>
-- 
cgit v1.2.3

