From d04a72a4ad6af0bfe75bbff36004d28adca179b2 Mon Sep 17 00:00:00 2001
From: lif <1835304752@qq.com>
Date: Mon, 22 Dec 2025 19:45:08 +0800
Subject: fix: use current page port instead of hardcoded 4096 (#5949)

Co-authored-by: Claude <noreply@anthropic.com>
---
 packages/desktop/src/app.tsx | 8 +++++---
 1 file changed, 5 insertions(+), 3 deletions(-)

(limited to 'packages/desktop/src/app.tsx')

diff --git a/packages/desktop/src/app.tsx b/packages/desktop/src/app.tsx
index 2ed529bbc..4f4b6f32c 100644
--- a/packages/desktop/src/app.tsx
+++ b/packages/desktop/src/app.tsx
@@ -29,13 +29,15 @@ declare global {
 }
 
 const host = import.meta.env.VITE_OPENCODE_SERVER_HOST ?? "127.0.0.1"
-const port = window.__OPENCODE__?.port ?? import.meta.env.VITE_OPENCODE_SERVER_PORT ?? "4096"
+const port = window.__OPENCODE__?.port ?? import.meta.env.VITE_OPENCODE_SERVER_PORT ?? location.port ?? "4096"
 
 const url =
   new URLSearchParams(document.location.search).get("url") ||
-  (location.hostname.includes("opencode.ai") || location.hostname.includes("localhost")
+  (location.hostname.includes("opencode.ai")
     ? `http://${host}:${port}`
-    : "/")
+    : location.hostname.includes("localhost") || location.hostname === "127.0.0.1"
+      ? `${location.protocol}//${location.host}`
+      : "/")
 
 export function App() {
   return (
-- 
cgit v1.2.3

