From 76a141090ea33da574d06e17cd1c5dbddbde2952 Mon Sep 17 00:00:00 2001
From: Aiden Cline <63023139+rekram1-node@users.noreply.github.com>
Date: Thu, 16 Apr 2026 23:31:21 -0500
Subject: chore: delete filetime module (#22999)

---
 packages/web/src/content/docs/bs/cli.mdx | 1 -
 1 file changed, 1 deletion(-)

(limited to 'packages/web/src/content/docs/bs/cli.mdx')

diff --git a/packages/web/src/content/docs/bs/cli.mdx b/packages/web/src/content/docs/bs/cli.mdx
index 979066acb..118b81ba4 100644
--- a/packages/web/src/content/docs/bs/cli.mdx
+++ b/packages/web/src/content/docs/bs/cli.mdx
@@ -571,7 +571,6 @@ OpenCode se može konfigurirati pomoću varijabli okruženja.
 | `OPENCODE_DISABLE_CLAUDE_CODE_SKILLS` | boolean | Onemogući učitavanje `.claude/skills`                              |
 | `OPENCODE_DISABLE_MODELS_FETCH`       | boolean | Onemogući dohvaćanje modela iz udaljenih izvora                    |
 | `OPENCODE_FAKE_VCS`                   | string  | Lažni VCS provajder za potrebe testiranja                          |
-| `OPENCODE_DISABLE_FILETIME_CHECK`     | boolean | Onemogući provjeru vremena datoteke radi optimizacije              |
 | `OPENCODE_CLIENT`                     | string  | Identifikator klijenta (zadano na `cli`)                           |
 | `OPENCODE_ENABLE_EXA`                 | boolean | Omogući Exa alate za web pretraživanje                             |
 | `OPENCODE_SERVER_PASSWORD`            | string  | Omogući osnovnu autentifikaciju za `serve`/`web`                   |
-- 
cgit v1.2.3

