From 76a141090ea33da574d06e17cd1c5dbddbde2952 Mon Sep 17 00:00:00 2001
From: Aiden Cline <63023139+rekram1-node@users.noreply.github.com>
Date: Thu, 16 Apr 2026 23:31:21 -0500
Subject: chore: delete filetime module (#22999)

---
 packages/web/src/content/docs/cli.mdx | 1 -
 1 file changed, 1 deletion(-)

(limited to 'packages/web/src/content/docs/cli.mdx')

diff --git a/packages/web/src/content/docs/cli.mdx b/packages/web/src/content/docs/cli.mdx
index 579038ad0..786b9d3d9 100644
--- a/packages/web/src/content/docs/cli.mdx
+++ b/packages/web/src/content/docs/cli.mdx
@@ -575,7 +575,6 @@ OpenCode can be configured using environment variables.
 | `OPENCODE_DISABLE_MODELS_FETCH`       | boolean | Disable fetching models from remote sources       |
 | `OPENCODE_DISABLE_MOUSE`              | boolean | Disable mouse capture in the TUI                  |
 | `OPENCODE_FAKE_VCS`                   | string  | Fake VCS provider for testing purposes            |
-| `OPENCODE_DISABLE_FILETIME_CHECK`     | boolean | Disable file time checking for optimization       |
 | `OPENCODE_CLIENT`                     | string  | Client identifier (defaults to `cli`)             |
 | `OPENCODE_ENABLE_EXA`                 | boolean | Enable Exa web search tools                       |
 | `OPENCODE_SERVER_PASSWORD`            | string  | Enable basic auth for `serve`/`web`               |
-- 
cgit v1.2.3

