From 76a141090ea33da574d06e17cd1c5dbddbde2952 Mon Sep 17 00:00:00 2001
From: Aiden Cline <63023139+rekram1-node@users.noreply.github.com>
Date: Thu, 16 Apr 2026 23:31:21 -0500
Subject: chore: delete filetime module (#22999)

---
 packages/web/src/content/docs/nb/cli.mdx | 1 -
 1 file changed, 1 deletion(-)

(limited to 'packages/web/src/content/docs/nb/cli.mdx')

diff --git a/packages/web/src/content/docs/nb/cli.mdx b/packages/web/src/content/docs/nb/cli.mdx
index 8b6d283e1..8312a1a7c 100644
--- a/packages/web/src/content/docs/nb/cli.mdx
+++ b/packages/web/src/content/docs/nb/cli.mdx
@@ -574,7 +574,6 @@ OpenCode kan konfigureres ved hjelp av miljøvariabler.
 | `OPENCODE_DISABLE_CLAUDE_CODE_SKILLS` | boolsk | Deaktiver innlasting av `.claude/skills`                              |
 | `OPENCODE_DISABLE_MODELS_FETCH`       | boolsk | Deaktiver henting av modeller fra eksterne kilder                     |
 | `OPENCODE_FAKE_VCS`                   | streng | Falsk VCS-leverandør for testformål                                   |
-| `OPENCODE_DISABLE_FILETIME_CHECK`     | boolsk | Deaktiver filtidskontroll for optimalisering                          |
 | `OPENCODE_CLIENT`                     | streng | Klientidentifikator (standard til `cli`)                              |
 | `OPENCODE_ENABLE_EXA`                 | boolsk | Aktiver Exa-nettsøkeverktøy                                           |
 | `OPENCODE_SERVER_PASSWORD`            | streng | Aktiver grunnleggende autentisering for `serve`/`web`                 |
-- 
cgit v1.2.3

